; 
; AUTHOR
; Stef Walter
;
; VERSION
; 0.8
; 
; LICENSE
; This software is in the public domain.
;
; The software is provided "as is", without warranty of any kind,
; express or implied, including but not limited to the warranties
; of merchantability, fitness for a particular purpose, and
; noninfringement. In no event shall the author(s) be liable for any
; claim, damages, or other liability, whether in an action of
; contract, tort, or otherwise, arising from, out of, or in connection
; with the software or the use or other dealings in the software.
; 
; SUPPORT
; Send bug reports to: <stef@memberwebs.com>
;
; Statocrypt.def : Declares the module parameters.

LIBRARY      "statocrypt.dll"

EXPORTS
	DllCanUnloadNow     @1 PRIVATE
	DllGetClassObject   @2 PRIVATE
	DllRegisterServer   @3 PRIVATE
	DllUnregisterServer	@4 PRIVATE
